<definetag name="lectureonline">
    <meta>
    </meta>
    <render>
    </render>
</definetag>
<definetag name="/lectureonline">
    <meta>
    </meta>
    <render>
    </render>
</definetag>
<!DOCTYPE HTML PUBLIC "-//IETF//DTD HTML 2.0//EN">
<html><head>
<title>500 Internal Server Error</title>
</head><body>
<h1>Internal Server Error</h1>
<p>The server encountered an internal error or
misconfiguration and was unable to complete
your request.</p>
<p>Please contact the server administrator at 
 root@localhost to inform them of the time this error occurred,
 and the actions you performed just before this error.</p>
<p>More information about this error may be available
in the server error log.</p>
</body></html>
